<template>
    <footer>
        <div class="footer--wrap">
            <div class="footer--container">
              <div class="footer--top">
                <div class="logo--wrap">
                  <NuxtLink to="/">
                    <img src="/img/footer--logo.svg" alt="그린웨일글로벌" />
                  </NuxtLink>
                </div>
                <ul class="menu--wrap">
                  <li><NuxtLink to="/company/intro">Company</NuxtLink>
                    <ul>
                      <li><NuxtLink to="/company/intro">회사소개</NuxtLink></li>
                      <li><NuxtLink to="/company/history">회사연혁</NuxtLink></li>
                      <li><NuxtLink to="/company/partners">협력업체</NuxtLink></li>
                    </ul>
                  </li>
                  <li><NuxtLink to="/products/materials">Products</NuxtLink>
                    <ul>
                      <li><NuxtLink to="/products/materials">Materials</NuxtLink></li>
                      <li><NuxtLink to="/products/solutions">Solutions</NuxtLink></li>
                    </ul>
                  </li>
                  <li><NuxtLink to="/technology/facilities">Technology</NuxtLink>
                    <ul>
                      <li><NuxtLink to="/technology/facilities">시설</NuxtLink></li>
                      <li><NuxtLink to="/technology/patents">특허 / 인증</NuxtLink></li>
                    </ul>
                  </li>
                  <li><NuxtLink to="/media/news">Media</NuxtLink>
                    <ul>
                      <li><NuxtLink to="/media/news">환경뉴스</NuxtLink></li>
                      <li><NuxtLink to="/media/press">보도자료</NuxtLink></li>
                    </ul>
                  </li>
                  <li><NuxtLink to="/contact/notice">Contact</NuxtLink>
                    <ul>
                      <li><NuxtLink to="/contact/notice">공지사항</NuxtLink></li>
                      <li><NuxtLink to="/contact/faq">FAQ</NuxtLink></li>
                      <li><NuxtLink to="/contact/support">고객센터</NuxtLink></li>
                      <li><NuxtLink to="/contact/location">오시는길</NuxtLink></li>
                    </ul>
                  </li>
                </ul>
              </div>
              <div class="footer--bot">
                <ul class="sns--list">
                  <li><NuxtLink to="/" class="blog"></NuxtLink></li>
                  <li><NuxtLink to="/" class="ytb"></NuxtLink></li>
                  <li><NuxtLink to="/" class="fb"></NuxtLink></li>
                  <li><NuxtLink to="/" class="insta"></NuxtLink></li>
                </ul>
                <ul class="info--list">
                  <li>사업자명 : 그린웨일글로벌 주식회사</li>
                  <span class="bar"></span>
                  <li>사무실 : 서울시 강남구 언주로 650 한국건설기술인협회 신관 2층</li>
                  <span class="bar"></span>
                  <li>대표이사 : 윤태균</li>
                  <span class="bar mobile"></span>
                  <li>사업자번호 : 861-88-01187</li>
                </ul>
                <ul class="info--list mt-[4px]">
                  <li>Tel : 02-3447-8801 / 8802</li>
                  <span class="bar"></span>
                  <li>E-Mail : green@greenwhaleglobal.com</li>
                </ul>
                <p class="copyright">
                  <span>
                    Copyright © Greenwhaleglobal. All rights reserved.
                  </span>
                  <span class="bar"></span>
                  <NuxtLink to="/">개인정보취급방침</NuxtLink>
                </p>
              </div>
            </div>
        </div>
    </footer>
</template>