<template>
<svg version="1.1" id="Layer_1" xmlns="http://www.w3.org/2000/svg" xmlns:xlink="http://www.w3.org/1999/xlink" x="0px" y="0px"
	 width="500px" height="500px" viewBox="0 0 500 500" enable-background="new 0 0 500 500" xml:space="preserve">
<path fill="currentColor" stroke-linejoin="round" stroke-miterlimit="10" d="M498.896,434.512l-1.779-2.428
	l1.295-0.323l-1.376-2.265l-0.891-0.81l-0.728-6.309l0.891-3.236l-1.617-3.479l2.911-2.993l-0.89-1.214l0.242-2.346l-2.021-0.242
	l-0.242-1.538l-2.833-2.506l0.243-4.854l-1.86-2.022l-1.538,0.889l-2.83-2.183l0.647-2.67l-1.375-2.67l-1.537,0.729l-4.531-3.316
	l-0.646-5.824l-2.832-5.502l-0.081-2.911l0.324-1.78l-4.935-2.992l-4.046-3.073l-3.559-3.965l-1.536-5.339l0.808-1.134l-0.808-3.962
	l-3.398-3.56l-1.484-1.421l-2.318-2.22l-2.668-3.883l-4.935-7.603l0.08-2.024l-1.697-2.587l-0.485-3.883l1.778-1.62l-0.728-3.478
	l-0.809-3.315l-9.018-7.292l-2.39-1.931l-4.044-6.066l0.243-3.155l1.455-0.81l1.053-2.264l-0.324-1.942l0.243-2.104l-9.141-9.302
	l-1.052-2.184l-3.883-4.045l-1.538-3.479l-7.441-7.361l-15.855-17.23l-0.324-2.75l-6.875-7.362l-3.641-4.854l0.809-3.478
	l-1.455-3.397l-4.109-2.964l-0.825-0.596l-3.965-4.934l0.082-1.78l-1.78-1.132l-2.265-2.104l-2.266-6.39l-5.015-6.229l-1.457-1.052
	l1.7-4.691l-2.185-0.243l-6.714-6.39l-4.692-6.149l0.405-2.427l-2.347-3.801l-7.281-8.089l-0.323-1.941l-1.939-2.023l-3.237-5.257
	l0.175-2.899l0.23-3.815l1.294-1.457l-2.104-0.889l-2.264-4.773l0.972-3.074l-3.5-5.114l-0.707-1.034l-4.45-6.471l-0.971-4.773
	l-1.939-4.45l0.242-3.64l-1.457-2.346l-2.831-2.669l-0.081-3.963l-2.184-1.294l-1.86-3.317l-0.81-3.316l1.051-1.132l-1.212-2.508
	l-10.921-14.642l-0.728-4.207l2.587-2.022l-3.56-4.61l-0.16-1.457l-2.75-2.103l0.403-1.86l-1.699-1.133l-1.536-3.236l-0.729-5.177
	l-0.646-2.508l-1.538-0.728l0.242-1.375l-1.617-2.103l1.294-2.347l-1.536-1.213l-0.972-2.346l-1.052-2.427l-1.456-0.242
	l-2.992-4.207l-1.619-3.883l-1.536-0.81l-0.97-4.368l-5.34,4.611l-6.796,1.941l2.427,5.096l-1.213,17.473l-1.214,10.678
	l-8.735,14.561l-5.097,5.339l1.375,1.78H251.2l-1.131,1.294l-0.809,2.831l-1.699,1.456l-1.132,4.044l-1.294-1.78l-3.316,0.485v1.619
	l-1.78,2.103l-1.941-0.971l-3.559,4.691v1.78l-1.294-1.294l-0.663,1.294l-1.279-0.647l-0.729,2.346l-2.75,0.647h-2.185l-0.971-1.294
	l-4.772,3.479l-1.213,2.265l-7.442-8.008l-2.265-0.323l-4.368,5.258l-1.618,2.265v2.913l-0.728,3.883l0.971,1.294l-1.375,1.375
	l-0.728,2.184l-1.213,0.566l-2.427-0.646l-1.132,1.456l-0.566-2.265l-1.861-2.022l-4.691-4.045l-4.529-0.971l-4.935-1.213
	l-3.479-0.648l-0.889,1.295l-1.942-0.647l-4.044-5.178v-1.699l-5.582,1.78l-3.964,0.809h-4.61l-2.265-4.611l-1.699-2.912
	l-1.456-0.486l-2.913,2.266l-2.67-0.971l-2.993,1.214l-1.617,2.103l-2.508,0.97l-3.883-0.404l-1.456,2.994l-2.346,0.162
	l-3.964-0.729l-2.103,0.567h-7.928v-1.375l-0.728-1.214l-2.022-0.728l-2.022,0.89l-1.78-1.051l-2.669,0.323l-1.456,1.619
	l-2.912,0.97l-1.618,0.162l-5.338,4.692l-1.618,0.162l-0.809,1.78l-2.589,0.97l-2.184-2.103v-4.368l-1.699-2.427l-1.132,1.132
	l-6.147,0.162v2.266l-6.229-3.883l-6.794-1.537l-3.317-0.081l-1.133,1.213l-4.044,1.456l-1.698-0.162l-1.861-1.132l-2.832,2.104
	l-0.971,1.779l-1.78,0.809l-2.265-0.566l-0.728-1.375l-3.074-0.89l-0.89,0.729l-2.67-1.052v-1.132l-2.184-0.081l-1.457-1.295
	l-1.86-0.727l-3.155,1.375l-2.346,1.861l-4.448,2.103l-3.56,1.052l-3.236-1.779l-0.89-1.052v-1.779l-0.97-0.647l-2.751,0.081
	l-1.213,2.751l-0.728,2.265l-1.617,1.051l-2.993,4.368l-1.294,0.566l-3.56,3.236v1.052l2.346,0.081l-1.213,1.618l0.485,0.728H3.83
	l-0.565,3.883l0.404,2.993l-0.242,1.86l1.375,1.375l2.832,1.18l2.75-1.422l1.941-1.699l1.538,0.728l1.456,0.647l-0.728,5.121
	l1.295,1.513l1.375,0.323l0.486,2.185l-1.133,2.086l2.427,3.333l2.103-0.89l-0.08,2.508l-0.728,1.78l0.728,3.64l1.86,1.394
	l1.214,0.709l3.883,4.611l0.809-1.731l-0.243-1.504l2.346,0.405l0.808-1.052l-0.081-1.438l1.214-0.342l3.155-1.698l0.404-1.699
	l1.213-0.809l0.243-1.132v-1.214l4.126-0.607l0.242,1.335l2.508,0.405l-0.081,1.051l-1.779,1.336l-0.163,1.819l-1.132,0.566
	l0.89,2.345l-0.81,1.538l-1.779,2.426l0.162,3.316h1.617v2.67l0.81,0.566l4.206-0.486l0.405-0.835l1.131,0.35l0.082,2.993
	l1.617,3.236h2.022l1.78,1.456l0.323-2.104l0.485-1.375l1.699-0.809l2.75-0.243l2.103-1.132l1.86-2.373l5.744,1.645l-0.243,1.941
	l1.942,1.052l2.266-1.375l1.456-2.427l1.051,1.456l1.376,0.485l1.024,3.154v2.913v1.78v2.831l-0.377,3.64l1.779,2.911l-0.242,2.832
	l0.97,2.346l0.324,2.508l0.97,1.941l2.185,1.78l5.663,0.566l1.294,1.699l1.456-0.971l4.692-0.404l2.103,0.809l1.86,5.824
	l-1.132,1.052l0.081,2.265l3.802,1.375h3.155l5.744,1.78l0.323,2.67l2.185,1.86l0.647,2.588l-0.97,1.457l0.242,1.699l0.81,0.971
	l0.162,2.507l-1.052,2.669l-1.132,1.78l0.162,2.184l-0.728,2.427l-3.56-0.729l-2.75,0.729l-1.86,2.427l-0.324,1.699l-0.89,0.971
	h-1.537l-1.294,1.052v1.699h-2.184l-2.266,1.78l-1.132,3.964l2.265,1.942l0.728,2.264l-3.802,4.936l0.729,1.375l4.369,5.581
	l0.323,2.347l-1.537,2.184l-4.368,3.155l-1.941,1.779l-0.728,2.186l0.404,1.939l0.971,1.052l2.75-2.991l1.213,0.079l2.347,1.699
	l2.184-2.427h2.508l-0.971,4.773l-1.537,6.39l-0.485,5.259l0.971,1.939l-1.456,1.215l-0.242,1.538l-2.265,0.484l0.323,2.103
	l2.023,1.619l2.912,2.506l1.294-1.375l3.317,0.162l0.89-2.345l3.155-1.78l1.051-1.618l2.265,1.941l5.258,2.588l2.265,0.972
	l0.728,2.912l2.589-0.484l1.618,2.749l4.53,3.479h1.375l1.214,1.78l-0.81,1.456l2.104,1.212l3.316-1.212l3.882,1.212l3.236-1.779
	l2.75,2.831l4.126,1.133l1.537-1.94l2.346,0.729l2.427,5.258l3.802,0.808l3.397,2.428l-1.132,3.802l-7.442,0.404l-0.89,0.729
	l0.081,1.212l-2.184,0.647v1.538l-1.86,1.375l-0.81,1.537l-2.507,1.456l-2.832,0.972l-0.081,3.073h3.56l1.294,1.213l1.051,2.588
	l0.972,0.972l2.426,0.566v1.698l-1.213,1.052l0.647,2.508l-0.161,3.397l0.542,0.941l0.67,1.161l-0.162,1.942h-1.86l-1.294,7.038
	l-0.97,0.889l0.162,1.051l-0.89,0.729l0.808,1.375l-1.698,0.972l-0.243,1.456l0.89,2.104h-3.883l-0.647,1.536l0.405,3.074
	l-0.81,1.455l1.133,4.126l-0.81,0.972l2.185,6.067l0.081,1.94h-1.617l-2.751,1.214l0.405,1.537l1.78,3.803l0.162,2.83l-0.566,3.316
	l-1.941,2.67l-0.162,5.338l0.323,1.376l-0.242,1.941l-1.132,1.214l1.941,8.413l1.051,2.911l2.346,3.075l4.691,4.125l1.537-0.809
	l1.456,0.809l1.213-1.294l1.941,0.242l2.265-1.619l2.669,0.486l2.104-0.486l0.81-2.183l0.97,0.162l0.243,1.295l1.375,0.16
	l1.698-2.346l4.369,1.214l1.86,2.669l0.809-1.132l-0.08-1.618l1.213-2.022l1.78-0.567l1.86,1.538l0.567-1.699l1.456-1.779
	l-0.162-1.699l0.242-1.859l-0.646-2.751l0.566-2.589l-1.456-3.478l-1.375-0.729l0.404-1.861l2.994-2.831l2.265-0.242l0.566-1.779
	l1.699-0.972l1.698-0.08l1.537-1.618l2.104-0.162l3.074,1.052l2.75,0.485l2.508,2.103l0.647,5.34l2.507,0.405l-0.081,1.294
	l1.294,1.132l-1.375,1.133l-0.971,2.508l1.214,0.809l0.08,1.942l1.618,1.213l1.213-0.728l4.45-1.053l1.699,0.324l7.685-3.722
	l0.243-1.375l0.728-2.508l1.537-1.294l0.728-2.75l2.427,1.213l1.78,0.082l0.081,2.183l1.86,0.729l0.404,0.972l2.508,0.728
	l1.699-1.456v-3.641l4.53-3.803l2.265-1.051l1.861,1.294l1.941,1.617l1.617,3.155l3.075,0.162l1.616-0.81l1.861,2.509l2.185,3.559
	l3.073-0.566l0.811-1.537l4.934-0.484l1.86-1.861l1.617,1.376l1.861,0.404l-0.891,3.073l0.081,1.457l-0.97,1.374l-2.508-0.161
	l-0.081,1.699l-1.457,1.214l-2.264,0.889l0.728,3.155l-1.86,0.484l-3.155-0.889l-2.589,3.56l1.779,3.235l1.619,1.456l2.588,0.81
	l1.052,1.859l2.426-1.052l1.538-2.508l3.56-1.294l1.375-2.022l3.479,0.325l1.617,2.264l0.89-2.507l2.59,1.454l2.104-1.293l2.75,2.67
	l1.051,2.264l-1.294,2.913h1.778l2.994,3.074l0.97,1.86v2.589h1.699l1.618-2.669l1.457,1.697l1.375-1.94l5.742,0.727l1.214-1.374
	l1.538-2.509l1.375-0.889l2.183,3.074l1.215,0.646l0.485,3.56l1.94-0.647l2.831,1.052v2.669l3.237,1.133l2.668-1.698l1.941,1.698
	l0.647,1.134l4.125,0.97l1.943-1.861l0.646,1.861l3.316-2.75l2.346,1.86v1.941l1.213,1.052l4.611,1.779l3.722,1.294l1.94,2.266
	l1.618-0.485l2.104,3.235l2.265,0.809l1.295-1.294l2.022,0.162l2.427,0.485l3.883,3.641l0.81-1.7l1.212-0.889v-2.104l-1.94-2.75
	l0.484-4.449l2.103,1.779l0.81-2.993l2.185-1.375l-1.374-2.428l1.697-1.617l1.941,2.022l2.265-0.08v2.426l1.699,0.971l1.133-1.133
	l3.964,0.081l0.485,3.398l2.75,2.749l0.404,1.538l3.641,0.646l2.021,1.457l1.456-0.891v-1.94l2.186,0.889l1.697,1.86v-3.56
	l3.236-2.911l1.294-3.479l-0.405-1.294l1.7-2.509l2.022,0.729l3.154-0.729l1.617,2.266v1.537l1.619,0.89l5.5-2.266l6.553,1.618
	l4.45,0.89l1.616,1.618l2.751,0.324v1.375l1.86-1.214l1.213-1.78l-0.566-1.697l0.972-1.214v-1.457l4.637-2.496l0.621-0.335
	l2.831,1.861l3.64,0.566l0.567,2.104l1.537,0.646l1.617-0.161l5.42,3.963l0.404,1.618l2.265,1.941l1.214,1.536v1.78l1.86,0.729
	l2.589-1.376l1.617,0.647l2.751-0.404l2.184,1.779l1.457-0.242l-2.023-2.67l-0.323-2.508l0.729-2.183l-1.536-2.509l2.426-2.751
	l2.347-3.154l4.689-2.669l-0.403-1.537l0.972-1.86l1.375-0.324l3.56,1.376l0.485-2.914l4.691-2.264l1.779-2.993l1.861,0.729
	l2.021-1.375l3.397,0.646l1.294-0.566L498.896,434.512z"/>
</svg>

</template>