<template> 
<svg version="1.1" xmlns="http://www.w3.org/2000/svg" xmlns:xlink="http://www.w3.org/1999/xlink" x="0px" y="0px" width="500px"
	 height="500px" viewBox="0 0 500 500" enable-background="new 0 0 500 500" xml:space="preserve">
	
<g id="충청남도">
	<path fill="currentColor" stroke-linejoin="round" stroke-miterlimit="10" d="M124.708,35.557l-10.62,12.709l-2.09,1.219
		l1.916,1.567l2.263,3.482l-5.397,3.656v-2.438l-2.089-1.044l-4.353-0.348l-1.042-2.139l-2.403-0.751l-5.033,0.376l0.751-1.503
		l-1.953-0.451l-2.555,0.451v2.555l-3.456,0.375l-1.352-0.601l-1.127,1.202l-5.71,0.977l-0.676-2.329l-2.704,2.404v1.277
		l-6.085,2.855l-1.803-1.653l-0.451,2.93l1.052,3.306h3.08l2.93,1.578l2.705,0.901l1.878-1.202l0.751,1.578l2.104-1.502l3.005,0.601
		l-1.353,2.179l1.729,1.052l1.878-0.751l1.052,2.404l-1.127,1.352l-1.503-1.277l-2.179,0.601l-0.901,2.855l-1.878-1.578
		l-2.479-1.803l-2.403-0.075l-1.653,0.751l-2.028-0.676l-1.803-0.15l-0.977,1.878l0.526,1.653l2.329,0.375l2.479-0.901l1.127,1.352
		l-0.301,2.629l1.202,0.526l1.353-0.826l0.977,0.826l-1.353,1.653l-0.451,1.953l1.202,1.427l2.93-3.305l3.757,0.751l0.525,2.554
		l0.977,0.751l-0.225,1.502l1.652,1.728l1.503-0.902l1.126-1.878l0.977,1.052l3.08-0.375l1.879,0.977l1.202-0.901v2.028
		l-0.752,2.404l-0.901,1.202l-2.554-0.451l0.45,2.629l0.226,1.954l2.704,1.277h3.456l1.803,1.502l-0.375,1.803H99.54l-2.028,1.728
		l-1.202-0.525l-0.301-1.052l-1.427,0.375v2.028l-2.028-0.676l-1.052,0.676l-0.301,2.104l1.428,1.202l-0.677,1.352h-3.831
		l-1.277-1.127l-2.328,0.375l-0.15,1.277h-2.028l-1.277,1.578l2.404,2.705l-0.226,4.658h-1.353l-1.127,2.854l-2.178,0.451
		l1.051,2.104l-0.15,1.427l2.404,2.329l-0.375,2.179l-3.907-0.977l-0.902-1.653l-0.225-1.803l-1.127-1.277l-1.803-1.578l1.428-2.479
		l-0.075-1.878l1.427-1.277l-2.78-0.601l-2.854,0.075l-1.953,2.104l-0.977,4.282l-2.479,1.502l2.028,2.629l2.179,0.376l-1.126,3.305
		l1.352,1.953l2.93,2.104l0.075,1.577l-3.756,0.676l-1.953-2.479l-1.202,2.104l-1.803,0.375l-1.75-0.977l-3.208,3.531l0.526,1.353
		l-0.526,1.502l-1.502,1.052l-1.878-0.676l-0.526-2.855l1.277-3.23l-1.277-1.428l-1.728-0.451l0.451-3.906l2.629,1.202l2.329-0.376
		l2.629-2.479l3.305-0.3l-0.15-2.329l-3.832-0.375l-2.93-1.427l0.901-4.433l2.479-2.179l-0.375-2.779l1.405-1.277l1.224-2.179
		l0.375-3.831l1.202-1.202l4.057,0.977l1.127-2.705l-4.057-1.126v-4.808l-3.531-1.878l-0.397-2.254l-1.931-1.353l-0.15-1.953
		l3.005-2.629l-1.652-2.93l0.15-1.277L60.4,81.368l1.352-2.028l2.179-3.23l-1.675-3.306l-2.683,0.901L57.17,73.33l1.953-2.104
		l2.329-0.375l0.804-2.028l-0.429-2.629l-2.254,0.3l-0.826,1.954l-3.456,1.427l-0.376,3.08l1.277,4.282l0.075,5.184l1.277,2.329
		l0.301,2.179l-1.954,5.409l-1.202,2.479l0.601,1.652l1.578,1.653l-2.329,1.277l-1.127-0.827l-1.277,0.977l-8.865-4.658l0.826-1.803
		l-1.953-0.226l-1.352,1.803l-4.433,1.728l-3.456,0.451l-0.526,1.728L30.5,99.098l-0.901-1.578l-1.427-0.826l-0.451,3.606
		l-0.601,1.578l-1.953,2.404l-1.277-1.352l-2.554,0.451l-1.578,1.728l2.93,0.751l2.028,2.329l-0.451,1.878l-1.653,0.977l1.578,1.202
		l0.225,2.404l0.075,1.052l1.803-0.451l0.601,1.728l-1.202,3.606l-2.179,2.779l-2.855,1.578l-1.277,1.353l1.803,0.977l1.427-0.451
		l1.427,2.329l-1.427,3.007l0.601,1.2l-0.676,1.202l1.277,2.554l1.277-0.301l0.601,2.78l0.977,3.681l1.202,2.854l-1.502,1.127
		l-2.029-1.556l-0.676-2.962l-1.427-2.393l-1.202-2.629l-1.202-2.232l-2.179-0.698l0.301-2.627l0.751-2.331l-1.502-0.526
		l-1.202-2.554l1.052-3.005l-2.404-0.902l-0.826-2.178l-1.052,2.93l-1.878,0.751l1.954,1.954l0.977,1.052l0.451,1.728l-1.052,3.606
		l-1.202,2.104l-1.953,1.127v2.028l1.277,0.676l-1.653,4.883l-1.277,2.2l-2.329,0.88l-1.653,1.653l0.826,1.533l-0.826,1.021
		l-2.554-0.451l-0.827,1.277L0,153.088l2.104,0.701l-0.676,1.652l1.352,1.182l-0.901,1.673l2.779,0.809l1.502,1.237l-1.202,0.884
		l1.277,2.258l-3.08,4.353l0.301,1.428l-1.502,0.451l0.751,2.554l0.451,1.127l-1.953,1.878l0.226,2.028l1.202,0.375l4.808-6.235
		l1.202-1.202l0.075-2.028l1.953,0.075l1.052-1.127l0.075-3.677l-2.179-3.61l-1.127-1.878l4.733-0.751l1.803,0.901l1.202-1.522
		l3.005,1.447l3.531,0.451l0.601,1.82l-2.028,0.959l3.155,1.127l2.254,2.854l2.028,0.226l2.179-2.705l0.977,1.728l-1.202,2.93
		l-2.479,1.728l-0.3,2.253l4.207-2.178l2.479,1.953l0.525,1.803l-2.479,3.23l-3.23,1.878h-3.23l-3.832-2.104l-0.901-1.653
		l-2.104-0.15l-1.728-1.127l-2.554,2.179l0.601,1.502l-1.502,1.353h-2.705l-1.653,1.352l1.803,2.329l-0.751,1.652l0.451,1.653
		l0.525,1.653l-0.3,1.803l1.352,0.751h3.832l1.352-0.977l1.728,1.653l1.427-0.977l3.005,0.977h2.104l1.126-2.554l-1.202-1.578
		l3.005-0.301l1.277-0.901l-0.375-1.502l7.062-0.375l0.451-1.353l0.075-1.878l2.404-0.301l0.676-1.502l-2.329-1.052l0.451-3.981
		l5.409,0.676l3.23-1.578l1.353-2.629l1.352-2.329l3.306-0.15l0.375,1.953l-2.779,1.202l0.601,2.178l-0.826,2.705l0.676,3.456
		l-3.531,3.005l-0.375,2.479l0.375,3.155l1.428,0.526l-0.977,1.953l0.375,2.028l2.705,0.526l2.103-1.127l2.93,3.155l2.554,4.433
		l1.127,6.085l0.075,5.484l-1.277,3.23l-2.93,1.728l0.601,5.033l-0.526,1.953l-2.028,1.427l0.826,1.503h1.427l1.052,3.08l3.23-2.179
		l0.225-1.953l-1.953-3.005l1.953-0.225l2.029,1.202l1.202,3.456l1.803-2.179l1.052-3.23l1.728-1.427l-0.977-1.277l3.08-3.005
		l1.578-1.427l0.526,1.803l2.855-0.827l0.451-1.427l1.578,0.15l3.531-2.629l0.676,1.502l3.756,0.676l2.479,1.502h4.507l4.809,1.277
		l0.15,2.479l-1.353,1.653l3.831-0.225l10.894,4.507l-0.826,1.352l1.126,1.502l2.254,2.329l-0.375,1.878l1.276,3.381v2.329
		l1.428,1.578l-2.555,4.658l1.428,3.23l2.63,1.653l1.728,1.728l2.329,2.028l-1.879,2.405l0.226,5.183l-0.45,3.982l-1.052,1.953
		l0.15,2.104l0.676,4.132l0.901,2.328h1.428l0.601,2.029l-1.577,1.051l0.751,1.578l-0.602,2.93l1.428,2.104l3.23,1.353v1.277
		l-1.353,0.826l-0.3,2.329l1.276,0.676l3.981-2.855l2.404-2.103l2.254-0.451l2.404,2.329l-1.578,0.826l-2.179-0.451l-2.704,2.705
		l-2.404,2.629h-3.08l-1.277,2.479l-1.427,3.381l-0.451,4.883l-0.977,1.052l0.075,1.803l-1.577,2.78l1.201,1.427h3.832h1.728
		l1.202,1.202l1.878-0.601l5.859,5.559l5.86,4.958l5.108,0.376v1.652l-2.479,0.827l-2.179,2.028l-0.977,1.652l-3.005,0.376
		l-2.329,1.502h-2.403l-1.428,2.329h-2.704h-0.901l-0.677,1.728l1.353,1.729l3.831,8.488h1.953l1.653,1.127l6.01,11.795l-0.15,2.629
		h-2.179l-1.803,6.16l-2.329,2.404l0.226,2.854l0.602,3.08l-0.677,1.953l2.329,3.531l0.301,4.658l-4.282,6.01l0.075,1.502
		l1.427,2.855l-0.826,1.052l-0.15,1.652l-2.254,3.306l-1.427-0.677l-3.981,0.677h-2.931l0.075,9.69l1.503,1.127l1.277,1.503h2.104
		l-1.578-3.155l-0.15-2.254l1.503-2.479l4.207-1.202l5.184,1.127l3.906,2.403l1.803,2.63l0.602,2.93l4.132-2.254v-2.254l3.23,1.052
		l1.803,2.555l3.53,1.803l2.555,4.958l1.803,4.057v1.729l0.977,1.276l1.878-0.826l0.602-1.127l4.508,0.526l-0.602,3.08l3.155,0.525
		l1.878-1.577l0.826,2.779l-4.432,2.404l-2.854-1.052l-1.729,2.479l3.306,0.601l0.301,6.311l0.225,3.005l3.381-0.451l2.329,2.855
		l2.254,1.052l2.854,4.507l1.503,1.277l-1.127,1.202h-1.653l0.977,3.681l-0.375,1.953l-1.127,1.953l1.127,1.729l2.179,0.676
		l2.104-2.028l2.779,0.526l6.461,0.826l3.455,0.676l3.005,1.953l1.804-1.276l2.179,0.901l2.103-6.235l1.729-4.207l4.282,0.075
		l2.779-1.653l8.264-0.977l3.756-0.676l2.028-2.254l2.404-3.906l3.756-1.202l3.23-0.226l7.813-3.23l1.277-1.502l0.826-2.329
		l0.601-6.611v-9.541l1.503-3.305l1.052-4.583l1.803-2.854l2.555-2.254l3.305,0.451l2.104,2.104l2.179,0.225l2.104-1.728
		l2.555-1.052l2.028-3.23l3.605-1.878l4.282-0.751l2.93,2.479l2.705,1.202l5.483,0.301l2.931-1.652v1.803l1.953,0.45l1.276-1.577
		l1.052,1.428l0.526,3.08l1.428,0.901l2.104-0.226l1.276-0.977l1.653,0.15l0.901-3.23l0.977,3.53l0.676,1.804l1.953,1.577
		l2.555,2.028v2.78l-1.578,0.901l0.075,3.38l1.503,0.677l-0.601,4.057l0.601,1.352v1.202l1.728,0.075l2.854,2.028l2.329,2.705
		l1.353,0.901l0.826,1.427l1.803-0.977l2.479-0.826l0.977,1.803l1.127-0.45l2.779,2.104l1.353,2.254l3.306-1.578l0.901-3.381v-3.155
		l1.127-2.028l1.652-0.149l1.127-1.127l1.803,0.226v1.878l2.479,0.977l1.503-1.052l1.652,0.525l2.93-3.08v-1.427l1.578-0.226
		l2.779,3.08l2.329,0.901l1.052-1.202l-0.602-1.428l1.503-1.577v-2.179l2.554-0.075l0.901,1.578l1.804-0.075l0.676-1.202
		l4.132,2.629v1.353l2.104,2.63l1.127,0.676l2.779,0.15l1.428-2.028l-3.456-2.854l-0.525-3.757l1.427-1.127l0.677-2.704l2.253-0.602
		l1.503,2.479l2.779,0.45l4.057-1.953l2.855,0.301l1.127-3.906l1.728-1.578l1.353-0.15l1.502,2.179l2.329,0.602v-2.179l1.503-0.602
		v-1.728l1.728-0.676l1.353,0.901l2.403-0.376l1.729,5.334l2.253,0.526l1.202,3.005l-1.577,1.502l-1.052,2.479l0.901,1.878
		l3.381,1.503l-1.127,1.728l0.15,1.953l0.977,1.503l-0.526,2.479l0.526,0.977l1.352,0.526l-1.352,1.953l0.075,3.306l1.276,1.202
		l2.028,2.854l0.977,2.028v1.953l1.578,1.728l-0.677,2.854l4.282,2.404l3.682,3.682l1.878-2.479l2.179-0.301l1.577-3.23l2.028-0.3
		l1.277-1.653l2.179-1.052v2.479l0.977,0.751l-1.277,3.381l1.277,2.104l1.728,0.15v2.028l1.353,0.901l0.526,3.381l1.878,2.179v1.502
		h2.704l1.127-1.953l2.028,1.953l1.127,1.127l3.531,0.826l2.254-2.629l1.803-0.977l1.052,0.525v1.503l1.728,1.577l0.977-1.577
		l3.757-0.901l3.455-2.555l1.578-2.254l-1.879-4.507l0.301-1.052l2.179-0.376l-0.901-2.028l-0.075-2.028l0.977-1.878l-0.751-2.855
		l-2.028-0.676l-0.301-2.854l4.132,1.353l2.028,0.45l1.277,1.953l1.878-0.3l1.428,0.977l1.052-0.226l2.554,3.155l2.028-0.451
		l0.901-1.276l2.555,0.826v2.254l1.728,0.751l1.127,2.554h2.404v1.804l0.826,1.201v1.729l1.803,0.075l1.277-2.78l-0.45-4.657
		l-1.804-1.202l-1.052-0.977l0.977-1.428l3.306,1.052l1.353-0.45v-1.953l0.977-0.602l1.878,1.653L498,450.83l-2.328-2.253
		l-0.526-1.954h-2.254l-1.803,1.277l-0.451-5.334l0.827-4.132l1.352-1.352l3.982,0.15l0.45-0.902l-1.202-2.328l-0.601-2.779
		l-3.155-3.682l-1.653-0.526l-0.074-3.155l-0.075-1.878l0.826-1.352l-0.977-1.503l-1.578-0.45l-1.052-2.63l-1.127,0.901
		l-2.704-3.681l-2.254-3.306l0.15-1.577v-2.029l1.127-3.906l2.554-2.179l-0.075-4.357l-0.901-2.028l-2.178-1.502l0.676-1.878
		l1.276-1.353l-1.877-3.981l2.178-3.456l0.075-2.629l-1.277-0.677l0.752-1.953l-2.705-3.306l-1.803-2.403l-4.132-0.977l-1.728,1.276
		l-1.202,1.277l-3.005,0.451l-2.93,0.301l1.577-5.785l-3.455-0.977l-1.277-1.878l0.826-2.028h-2.329l-2.93,3.005l-1.202,1.428
		l-2.254,0.45l-3.08,0.901l-3.381-0.375l-0.525,2.028l-3.005,1.427l-0.826,1.653l-3.005,0.901l-0.376,2.404l1.127,0.676
		l-3.756,1.052l-0.15,1.652l-1.953,0.901l1.127,1.729l-1.954,1.803l-3.005,1.428l-2.253-1.729l-1.202-2.403l-2.479-1.353
		l-1.503,0.601l-3.605-2.403l1.127-2.028l-0.977-1.729l-1.353-0.3l-0.901-2.705l-0.226-2.028l-1.353,0.676l-3.079-0.676
		l-0.075-1.652l1.427-0.752l-0.375-1.577l-1.127-3.606l1.577-3.831l-2.93-3.08l-2.854-1.127l-1.052,1.428l-2.028,0.375l-0.901,0.526
		l-0.226,3.981l-0.376,1.277l1.803,1.127l0.075,3.005l-1.352,3.455l0.751,1.277l-0.15,1.804l-1.052,0.977l1.503,1.276l-0.075,1.428
		l-1.428,0.15l-0.15,2.028l-2.104,0.676l-1.953,3.155l0.301,2.028l-2.329,3.907l-0.901-0.15l-0.15,2.028l-0.977,0.826l-1.277-0.751
		l-0.075-3.456l1.277-3.005l-1.577-1.503l-2.028,0.376l-0.752-4.508l-2.028-3.305l-3.305-2.705l-0.226,3.005l-2.404,0.301
		l-1.277-1.127l0.226-2.179l-1.728-2.254l-2.254-0.751l-0.601-6.611l1.427-2.179l3.306-2.104l-1.127-1.276l-2.779,0.45l-5.108-3.605
		l-1.879-0.376l-4.356-5.784l1.652-2.63l2.779,0.451l0.376-2.93l-1.052-1.127l-0.075-5.108l1.052-1.503l-0.901-2.479l2.254-0.226
		l0.977-1.353l-0.677-2.329l1.953-2.328l2.404-0.602l-0.601-2.629l-1.729-1.578l-0.826-2.404l2.78-1.878l0.601-4.057l-0.826-5.033
		l0.15-3.906c0,0,0.901-2.93,0.977-3.155s0.375-3.981,0.375-3.981l-2.028,0.525l-3.005-1.728l-2.779,0.525l0.075,3.381l-2.705,0.526
		l-2.328-4.809l-3.381-0.149l-2.404-3.081l-2.179-3.53l-3.229-0.075l-3.156-1.578l0.827-3.455l-1.277-1.803l1.803-0.902l0.677-1.953
		l-0.902-3.08l-1.878,0.15l-2.179-4.808l1.428-1.653l0.451-2.779l-3.757-2.028l-2.179,0.901l-1.427-2.854l1.728-1.353l-2.254-2.479
		l-0.225-1.953l4.057-3.08l-3.606-5.334l0.676-3.155l1.729-1.728l1.803,0.826l2.403-0.751l-1.953-2.629l2.254-4.958h1.878
		l1.578-1.052l-0.075-2.329l1.353-2.028l-2.028-2.254l-2.179,1.277l-1.428-0.451l-0.826-2.253l0.601-3.531l-2.253,1.878
		l-5.184-4.883l-4.207-1.502l0.3-3.155l-2.028-1.878l2.104-2.179l2.104-0.075l-1.502-6.761l-0.977-4.357l2.253-1.653l-0.225-2.329
		l-2.179-1.578l1.352-2.554l1.954-2.028l-2.104-7.813l-5.259,2.629l-1.879-6.536l-2.93-1.202l3.757-2.404l3.455-2.254l1.277-3.531
		l1.578,0.676l0.826-2.629l3.605,0.15l0.752,1.803l3.23-0.451l3.906,0.375l3.23,1.502l0.225,2.104l3.005,1.353l3.006,0.526
		l-0.226,2.028l1.953,1.352l1.652-0.676l1.578,2.554l2.028,2.855l2.479-0.075l1.352,0.977l2.404,0.301l2.479-1.353l2.705,2.028
		h1.878l2.028-2.554l4.883-3.005l-0.901-2.104l1.353-5.334l2.779-0.676l2.404-3.08l1.352-0.977l2.555,2.178l2.329-2.479
		l-3.456-4.883l0.901-2.029l4.057-0.375l2.179-1.202l1.052-2.254l3.381-0.15l0.977,1.653l4.508-0.601l0.525,2.479h1.653l0.977,2.404
		l3.08,1.427l0.225-2.254l1.804-1.803l0.226-1.728l2.629,0.15l0.226-1.428l-2.028-4.507l-3.606-1.202l-0.525-2.104l-2.63-1.428
		l2.93-4.658l-1.728-2.704l-4.808-4.733l-4.733-1.427l-3.38-2.404l0.3-1.578l-1.728-2.104l-2.404,0.827l-3.53,0.15l0.15-3.23
		l0.601-3.681l-0.15-2.93l-2.179-1.953l-2.104,0.751l-2.028-1.202l-1.728,0.676l-2.555-2.028l2.179-2.705l-0.075-4.883l-1.728-2.104
		l-8.489-5.559v-2.479l-1.652-3.155l-4.583-0.526l-2.629-3.456l-2.78,2.178l-3.005-2.028l-4.808-3.155l-3.306,0.225l0.526-3.155
		l-1.879-1.653l0.075-1.953l-1.427-2.554l-3.982,0.375l-1.126-1.578l-2.329-0.676l0.075-1.878l-4.583,0.451l-3.306-1.352
		l1.804-2.329l-5.033-0.3l-4.058,1.653l-6.085-2.104l-5.634,5.334l-0.226,1.653l2.179,0.601l-1.652,2.404l-0.376,2.779l-3.306-3.23
		l-4.282,4.583l-2.329-1.878l-5.935,3.832l-3.455,0.075l-1.879,1.953l-3.23-1.277l-3.079-2.179l-5.185,0.3l-4.657,1.578
		l-2.028,1.803l-12.396,4.207l-7.438,4.131l-1.652,1.878l0.3,4.057l-1.502,1.427l-8.188,0.526l-6.16,3.306l-11.419-3.907
		l-3.155-3.08l-1.428-7.888l-0.301-4.357l-2.178-2.329l-1.052,2.93l-3.982-4.958l0.902-2.329l-4.508-9.616l1.277-3.005l-11.27-5.484
		l-2.479,0.676l-1.728-1.728l-5.71-1.052l-4.282-3.005l-1.878,0.977l-1.652-1.127l-6.987,0.451l-9.841-0.3l-3.005-0.751l-18.03-9.24
		l-1.953,0.375l-4.207-3.005l-0.301-2.329l-3.605,1.052l-4.733-2.855l-2.479-1.803l0.45-2.629l-2.704-3.606l-6.761-2.104
		l-1.503,2.329L124.708,35.557z"/>
	<polygon fill="currentColor" stroke-linejoin="round" stroke-miterlimit="10" points="181.664,179.023 181.664,181.653 
		182.779,183.486 179.591,185.957 177.758,184.204 178.476,182.49 176.882,180.617 175.606,179.979 177.36,178.465 179.193,179.899 
		180.07,178.864 	"/>
	<polygon fill="currentColor" stroke-linejoin="round" stroke-miterlimit="10" points="256.581,79.638 254.748,80.275 
		254.11,82.586 255.346,83.463 254.668,84.738 255.704,85.774 257.219,84.419 259.291,85.137 260.726,83.623 261.363,81.949 	"/>
	<polygon fill="currentColor" stroke-linejoin="round" stroke-miterlimit="10" points="243.909,85.217 240.083,85.774 
		240.402,86.731 241.996,87.448 242.793,90.716 245.423,91.194 247.655,89.68 244.308,87.289 	"/>
</g>
</svg>

</template>