<template> 
<svg version="1.1" xmlns="http://www.w3.org/2000/svg" xmlns:xlink="http://www.w3.org/1999/xlink" x="0px" y="0px" width="500px"
	 height="500px" viewBox="0 0 500 500" enable-background="new 0 0 500 500" xml:space="preserve">
	 <g id="전라북도">
	<g>
		<path fill="currentColor" stroke-linejoin="round" stroke-miterlimit="10" d="M495.351,157.866l-1.987-6.094
			l-0.133-2.782l-2.782-0.53l2.65-3.047l-2.518-2.65l-4.637-1.59l1.06-2.12l-1.06-3.709l0.795-5.432l-4.372-0.663l-0.795-1.854
			l-2.253-1.458l-1.457-3.179l-4.106,2.252l-2.915,0.132l-3.974,3.047l-6.625,0.53l-3.577,4.77l-1.986-0.663l-3.577,1.06
			l-2.12,0.795l-2.252-1.192l1.192-2.782l-0.397-1.855l-2.649,0.397l-1.59-2.12l-1.458,0.795l-0.529,1.855l-2.12-3.047l-3.444-0.265
			l-3.047-1.325h-4.902l-1.854-2.649l-0.133-7.154l-1.722,0.53l-0.928-2.385l-6.094,5.034l0.927,4.107l-2.384,1.59l-1.987-0.397
			l-1.192-5.167l-0.397-2.782l-2.385-0.928l0.265-1.854l-1.987-1.987l-6.359,0.795l-1.722,5.167l0.132,5.829l3.445-0.663
			l1.192,2.252l2.385,0.927l-1.061,2.782l-2.649-1.987l-1.325,2.915l-3.576-0.265l-1.723,1.06l2.518,1.987l1.06,4.504l-1.854,3.842
			l-2.12-2.517v-2.252l-2.518-0.928l-1.324-2.915l-1.723-2.782l-2.782-0.662l-2.782,2.12l-1.987-2.649l-1.192-0.795l-1.987-1.06
			l-1.59,0.53l-2.119-2.649l-2.12-0.53l-3.577-0.927v3.842l2.253,0.132v3.312l-0.53,1.722l1.06,3.445l-2.252,1.192l1.457,4.637
			l-2.517,3.709l-2.039,1.142l-1.273,0.712l-3.975,2.12l-2.384-3.577l-2.65,1.06l-1.854,2.915l-3.975-0.795l-2.385-3.313
			l-2.119,2.252l-2.782-0.265l-1.854-5.564l-1.061-4.372l-2.649-0.795l-0.265-3.709l-0.53-4.902l-4.372,2.65l-2.782,4.107
			l-2.781,0.397l-1.855,1.854l-2.252-3.444l-3.577-1.987l-2.119-0.397l0.132-3.047l-1.325-3.577l-2.781-4.637l-2.518-1.987
			l1.325-3.445l1.722-1.59l-1.59-1.722v-2.649l-1.192-2.252l1.192-2.649l-3.577-2.65l-0.132-3.577l1.722-1.723l-0.794-2.517
			l-2.518-1.59l-1.457-2.915l0.132-2.385l-3.577,0.663l-2.385-0.927l-0.529,2.517l-1.192,0.927v2.12l-2.385-0.53l-2.252-3.18
			l-2.782,1.987l-0.662,3.975h-3.577l-3.048,2.252l-3.179-0.397l-1.855-3.047l-2.517,1.325l-0.397,2.252l-1.723,1.325l0.133,3.577
			l3.577,2.517l-0.663,2.782l-2.914-0.133l-3.047-3.047l-4.77-4.24l-1.987,1.325l-1.987-1.59h-2.649l-1.061,4.107l1.325,1.457
			l-2.782,1.06l-3.444-3.445l-1.723-0.662L249,104.476l-3.644,0.53l-1.722-1.192l-0.795-1.722l-4.107,1.722l-1.59,2.385
			l-0.529,5.829l-3.445,1.458l-6.358-4.77l-4.372,0.53l-5.697-4.505l-3.576-3.842l-0.266-4.77l-1.457-4.504l1.59-1.192l0.133-2.782
			l-5.962-5.299l-0.928-2.12l-1.324,1.987l-3.048,0.795l-2.385-0.265l-2.119-5.034l-1.192,1.325l-1.987-0.663v-1.457l-2.518,1.325
			l-7.816-0.265l-3.908-3.312l-5.763,1.192l-3.378,2.385l-1.192,2.385l-3.577,2.186l-2.98,0.795l-3.379-2.385l-3.577-0.397
			l-3.775,5.365l-1.06,4.504l-1.458,3.445v10.4l-0.729,6.624l-1.391,3.179l-0.922,0.363l-7.822,3.082l-4.57,0.53l-2.584,1.06
			l-1.391,2.451l-2.649,3.378l-3.644,1.06l-8.876,1.325l-2.584,1.192l-4.901,0.331l-1.392,2.318l-1.126,3.312l2.849-0.596
			l2.054,1.391l-1.325,5.233l-2.054,3.179l-3.18,1.855h-2.848l-2.981-1.391l-3.842-2.318l-2.98,1.987l-3.776,2.12l-5.034,0.397
			l-1.59-0.265l-6.359,1.987l-7.684,0.397v3.577h-2.583l-0.397-3.378l-31.266,2.053v10.797l2.119,1.192l-0.464,2.054l0.682,0.463
			l-1.269,3.308l-11.127,34.295l-0.416,1.36l-0.839-0.227h-1.851l-0.151,0.68l1.7,2.72l-4.948,6.479l-1.246-0.511l-2.795-0.756
			l-0.604,0.227l-0.642-0.604l-0.756-1.171l-1.133-0.831l-1.397-0.302l-0.869,0.378H5.196l-0.528,1.662l2.002,0.491l-0.114,0.642
			l-0.755,0.416l1.737,0.944l0.453,1.171l-0.68-0.265l-0.566,0.416l0.188,1.058l-0.188,0.566l0.378,0.68l-0.378,0.793l0.453,1.133
			l0.982-0.265l0.68-0.302l0.604-0.415l-0.113-0.831l-0.681,0.075l-0.49-0.075v-0.793l0.68-0.302l-0.68-0.907l0.755-0.151
			l0.604,0.944l0.566-0.34v-0.566l0.831-0.907h1.359l-0.113,1.284l-0.868,0.793v0.642l1.284,0.377l2.342,0.378l0.491-0.491
			l1.058-0.264l0.445,1.771l12.011,31.35l4.457,3.701l7.452,10.318l-2.833,2.566h-2.451l-1.523,3.775l-0.795,2.318l-0.993-0.729
			l-1.392,1.723l-1.126,2.053l-5.564,4.306l-2.98,1.855l-2.849,3.113l-1.987,1.324h-2.849l-2.98,2.915l1.392,1.06h1.589l0.663,1.854
			l-1.392,2.054l1.59,0.597v1.324l-2.186,0.729l-1.126,1.987l0.596,1.325l1.723,2.915l1.722,0.463l1.259-0.993l3.908,3.577
			l0.266,2.583l1.457,0.928h1.788l2.65,2.119l1.722,1.325l0.795-1.259l0.662-2.45l1.392,0.529l0.464,2.782l2.716-0.53l5.563-2.119
			l5.433-0.597l4.371-1.391l3.313,1.06l4.107-0.662l2.914,1.324l5.101-0.596l10.003,2.849l2.318-2.385l1.655,1.788l2.054,3.908
			l1.06,0.994l-2.45,1.523l-0.066,3.312l-2.915-2.583l-1.987-2.518l-3.908-0.927l-1.722-0.729l-2.385,0.729l-0.066,1.457
			l-0.861,0.596l-2.318-0.993l-0.662,0.464l-0.928,4.504h-1.325l-1.523,3.246l-1.722,2.518l0.331,0.86l-0.729,1.061l-5.101-1.723
			l-5.763,0.53l-2.584,2.385H41.4l-1.987,1.921l-1.59-0.928l-4.637-0.133l-0.132,1.325l-2.12-0.795l-1.523,0.795l-4.372,2.649
			l-0.861,1.458l-0.331,1.854l-1.192,0.265v1.723h-1.325l-1.126-1.723l-0.331-2.318l-2.782,5.564l-1.192,0.596l-0.596,1.59
			l-0.066,1.192l-3.113,6.095l0.199,2.318h-1.523l-6.757,11.989l-0.928,0.53l-1.723,4.901L0,372.686l1.06,1.723l1.59,0.265
			l2.451-1.457l1.59,0.265l0.795,2.583l2.782,0.928l3.644,0.331l2.45-1.656l1.325,1.325l0.265,2.252l2.187,2.782l1.457,0.464
			l0.529,2.252l-0.86,4.902l-1.656,1.986l-1.523,0.53l-0.729,1.192l1.192,0.53l0.265,2.054l2.649,2.119l1.987,0.397v2.649
			l0.066,1.126l-0.662,1.192l0.397,1.458l-1.656,1.655l0.529,1.524h1.192l0.928-1.656l2.981-2.849l1.589-0.066l0.53,2.915
			l1.921,2.119l-0.596,3.71l-0.464,1.06l0.265,2.12l-1.391,1.655l1.192,1.192h1.259l1.126,5.034l1.391,0.53l0.662,2.054l2.318-0.729
			l1.855-0.53l1.921-1.325l1.259,0.066l2.716,0.861l0.729,1.656l1.324-1.457l2.054,0.132l1.03,2.782l1.487,0.266l1.391,1.258
			l1.325-2.053l0.662-4.969h-2.849l-0.795-2.649l1.523-2.385l1.855-0.662l1.854,0.861l1.723-1.126l0.795-1.523l2.119,1.655
			l2.385,1.259l1.06,1.921l1.523,0.199l1.392,1.06l3.577-0.066l2.186,0.464l0.597-1.789l-1.259-1.258l1.391-0.861l1.921,0.927
			l1.59-2.914l0.928,0.397v-2.649l0.133-2.318l1.192-0.199l0.596-2.318l1.789,0.133l3.047,1.258l1.523,1.723l2.385-3.511
			l1.026,0.993l1.425,0.133l1.192-4.106l0.662-2.584l5.365,0.331l3.444-5.034l0.464-3.577l-0.529-3.511l-1.789-1.191l-1.325-0.729
			l2.518-1.126l2.584-0.795l1.854-2.054l2.053-2.649l2.451-0.596l-0.397-1.523l-0.861-1.524l0.331-3.179l-0.396-2.318l-2.584-1.458
			l-1.722-3.18l0.795-1.523l2.119,0.663l2.385-1.987l0.596-1.921l2.65-2.65l2.053-0.065l0.616-0.251l2.961-1.207l3.18,1.06
			l1.656-0.463l6.293,0.132l-0.066-1.391l0.53-0.861l-1.259-1.126l0.662-2.782l1.59-1.324l2.981-0.066l0.86,2.318l1.392,0.662
			l3.113,0.066l-0.795,2.649l-0.066,2.186l-1.126,1.259l0.928,1.723l1.59-1.59l2.053-0.397l2.716,0.994l3.776,0.86l2.517,2.252
			l1.259,0.332l0.993,1.59l3.114,0.529l1.722,2.12l1.656,0.993l-2.518,3.113l2.054,1.723l-0.397,3.246l2.086,0.86v1.789l2.816,0.066
			l1.258,1.523l-1.06,2.451l0.199,1.655l3.179-1.324l1.789-0.133l-0.133,1.656v1.987l1.392,0.795l1.457-0.795l1.391,0.861
			l1.59-0.663l0.994,0.53l1.06-0.662l1.921,0.662l2.318-0.464l3.048-1.656v-2.385l-1.855-3.378l0.266-2.716l-0.199-2.782
			l1.789-0.133l1.722,0.729v-1.655l1.523-0.133l-0.795-2.318l1.854-1.391l1.922-0.199l0.993-2.517v-2.65l-0.662-1.722l0.662-3.313
			l4.107,1.192l0.927,1.854l3.842-2.914l3.577-0.53v3.047v4.505v5.564l2.253,1.192l1.06-1.59l2.385,3.047l-1.192,1.854l-1.192,5.829
			l1.06,1.723l-1.854,2.252l-3.71-0.662l-1.722,0.662l0.397,2.385l2.914,3.18l0.795,2.12l2.518,1.324l3.312-2.252l2.782,2.782
			l-0.662,2.119l2.119,1.723l-1.854,3.842l1.854,1.59v3.18v1.59l-1.457,1.987l-2.252-0.53l-1.192-1.325l-1.192,0.266l-0.662,4.901
			l-2.252,2.518l2.517,2.518l4.372-0.133l1.192,2.119l1.854-0.265l6.889,2.782l0.663,1.59l2.252-0.133l1.192,1.325h3.18l4.504-2.252
			v-1.987l5.697,0.132l0.662-3.577l3.975-3.444l3.71-3.18l1.192,1.458l4.371-3.047v1.32v3.051l1.325,1.59l1.854,1.325l1.457,1.457
			l3.445,0.265l1.59-2.781v-3.18l2.252-2.12l4.106,0.53l5.829,6.491l0.53,1.854l2.518,1.061l1.987-1.061l8.081-0.132l5.432,3.975
			l5.564-0.928l2.119-1.987l0.53-1.854l3.842-0.928l3.975-1.854l3.18,2.385l2.782,1.192l1.59,1.457l0.795,2.385l1.987,0.795
			l2.385-1.723v-1.987l1.324-1.722l1.854-2.649l1.591-1.325l3.312-4.372l1.59-5.962l6.624-5.432l1.987,1.325l4.901-1.192l3.18-0.795
			l2.782,0.662l2.12,2.252l4.106-0.795l3.18,3.18l1.854,0.397l1.59,2.253l2.65,1.06l2.252,3.577l2.914,0.265l0.663,2.649
			l2.385,0.928l1.722,1.59l4.505,1.325l3.047,3.974l3.18-0.265l6.227-3.842l0.53-2.252l2.119-1.458l2.649-2.119l0.663-4.372
			l-0.928-1.723l-1.59-1.06l-1.722-3.577l-0.398-2.649l0.796-1.457l2.384-0.928l2.65-2.518v-2.517l2.119-4.77l1.723-2.517
			l3.18-0.796l2.385-4.371l2.252-0.53l1.06-4.637v-4.107l1.987-1.457l1.192-2.782l-1.06-1.192l-3.18,0.663l-2.252-1.458
			l-1.987-0.132l-1.59,1.324l-2.915-5.432l0.663-4.372l-0.397-2.517l2.914-1.325l2.915-2.252l-1.325-1.854l0.397-2.782l-2.385-0.133
			l-1.06-3.18l-2.252-3.047l0.529-2.518l-2.385-0.927l-0.795-1.723v-2.649l-1.854-1.325l-1.987-0.265l-1.987-1.325l-0.795-1.59
			l-3.577-1.987l-1.457-2.252l-2.252-0.662l2.252-4.902l1.854-3.312l2.915-1.59l1.987-2.12l-1.457-4.637l2.119-1.722v-3.71
			l5.3-3.577l2.385-0.132l-2.253-3.445l-1.59-2.252l0.397-2.252l-0.529-1.723l-1.458-1.324l3.577-5.433l-0.662-2.649l2.518-1.457
			l1.589-2.385l-0.529-3.842l1.722-5.696l3.18-3.71l1.458-0.663l0.927-1.59l-0.265-3.179l1.192-3.048l-0.397-2.517l-0.53-2.252
			l0.663-2.12l-0.397-3.047l0.927-2.915l-0.529-2.517l1.59-3.577h2.119l1.854,1.722l1.723-3.047v-1.59l5.063-3.949l1.562-1.218
			l2.385-0.265l2.517-2.252l1.061-2.252v-3.577l3.047-0.795l0.662-3.709l2.253-2.649l-0.663-2.518l1.987-4.107l2.915,1.06
			l1.59,2.252l2.252-0.795l2.252,0.133l2.12-1.722l1.192-2.65l2.517-1.59h1.325l3.577-2.517l4.239,1.987l1.06-2.517l1.723-2.65
			l2.385-1.06l2.914,0.795l1.723-1.325v-2.252l0.662-1.325l1.723,0.662l1.06-1.987l-1.06-3.71l1.722-2.782l0.795-3.842l1.987-0.265
			l1.723,1.325l5.432-2.12l0.795-2.518l-1.987-1.722l-0.265-3.577l2.252-1.723l5.962-3.312l1.457-3.444L495.351,157.866z
			 M77.035,218.573l-1.359-2.04l-1.813-0.453l-3.966-0.227l-8.385,2.493l-4.079,2.606l-4.759,6.346l-3.173,3.853l-1.7,1.133
			l0.907,1.247l-2.04,3.513l0.566,1.586l1.36,0.906l-0.566,3.513l-2.38,1.473l-0.906-1.926l-2.153,0.453l-1.586,1.473l-2.606,5.666
			l-1.02,2.833l6.005,2.379h1.36l0.68,1.133h2.152l2.153-1.02l1.473,0.227l-0.68,2.38l-2.72,1.474l-3.966,1.133h-0.377h-1.7
			l0.151,1.548l-0.378,0.228l-6.27-9.217l-0.944-0.906l0.075-0.982l-0.491-0.302l-0.906,0.302l-1.436-0.906l-0.34-1.435L30.2,248.6
			l-3.399-9.329h0.717l1.247-0.793l1.134-1.02l0.906-1.737l1.02-0.151l1.36,0.151l1.681-0.454l1.907-0.188l0.604-0.604l0.302-0.755
			l-0.944-0.718l-0.227-0.68l-0.718-0.566h-1.095l-0.265-0.454l0.265-0.491l0.868-0.454l-0.188-0.755v-1.511l0.528-2.077
			l-1.359-0.755l0.113-0.34l1.473,0.566l0.944-0.416l0.831-1.624l-0.188-0.491v-0.416v-1.02l-0.604-1.077l-1.246-1.832l-1.738-2.001
			l-1.321-2.078l-0.982-0.433l-2.229,1.415l-0.528,0.604l-1.55,0.491l-1.661,1.397l-4.23,1.888l-0.755,0.756v0.982l0.302,0.755
			l2.946,1.171l1.775,0.113l1.964-0.718l1.436-0.227l1.473,0.416l1.096,1.058l0.831,0.491l1.435,0.076l-0.188,0.34l-1.775-0.038
			l-0.944-0.416l-0.981-1.171l-1.247-0.302l-1.774,0.34l-1.436,0.567l-1.436-0.038l-0.906-0.151l-0.643-0.34l-0.868,0.188
			l0.227,1.058l-0.265,1.813l-3.021-7.969l-0.642-1.133l1.171-0.642l0.264-0.718l-1.435-0.264l-0.604-0.963l4.268-4.589l1.322-1.397
			l1.896-2.304v-1.7v-0.907l-0.642-0.264l8.619-27.686l0.868-1.851l1.345-1.473l1.171,0.151l0.718,1.247l-0.793,1.095l-0.378,1.171
			l0.68,0.793l1.284,0.454l2.418-0.793l1.511,1.095l0.075,0.869l1.096,0.869l1.095,0.038l1.433,0.999l-1.659,1.343l-0.68,1.247
			l0.906,2.266l-0.227,1.926l-2.039,1.246l-1.247,1.473h1.587l0.34,2.153l0.906,1.7l1.134,4.646l0.793,1.813l3.399-1.133
			l5.438-0.113l11.444-2.153l6.346-1.133l3.513-0.113l7.252,1.133l1.02,4.419l-4.419-1.02l-4.76-0.567l-20.509,4.873l-9.291,1.359
			l-0.567,1.586l-0.415-0.038l-0.378-0.755l-1.095,0.265l-1.096,0.717l-1.096,0.34l-1.095,1.247l-1.134,0.68l-1.624,1.625
			l-2.114,0.793l-0.567,1.02l0.529,2.19l1.02,1.284l1.171,0.944l1.397,0.264l0.756-0.755l1.699-1.171l2.398-0.076l-0.208,0.831
			h-0.604l-1.057,0.189l-1.587,0.982l-0.642,0.755c0,0,0.188,1.247,0.188,1.417s1.171,1.454,1.171,1.454l2.19,1.058l1.474-0.377
			l0.377-0.34l-0.49-0.491l0.528-0.755l0.906,0.075l0.303,0.454l-0.303,0.529l0.529,0.188l1.058-0.717l0.264-1.322l-0.717-1.624
			l-1.436-0.944l-1.549-0.566v-1.133l0.416-0.68l-0.189-0.944l0.416-1.775l-0.189-1.133l0.34-1.171l-0.34-1.058l0.453-0.717
			l0.357-0.075l0.021,0.868l-0.075,1.02l-0.303,1.096l0.113,1.322l-0.415,1.737l0.435,1.628l2.021,1.054l2.153,2.04h1.246
			c0,0,2.039-0.906,2.152-1.246s1.474-2.833,1.474-2.833l5.552,0.113l7.025-1.075l5.213-0.965l4.985,0.965l5.099,2.321l3.399,2.719
			l2.946,1.473l3.626,0.793l1.02,3.286l-5.099-1.246l-4.533-2.153L77.035,218.573z"/>
	</g>
</g>
</svg>

</template>