<template> 
<svg version="1.1" xmlns="http://www.w3.org/2000/svg" xmlns:xlink="http://www.w3.org/1999/xlink" x="0px" y="0px" width="500px"
	 height="500px" viewBox="0 0 500 500" enable-background="new 0 0 500 500" xml:space="preserve">
	 <g id="전라남도">
	<g>
		<path fill="currentColor" stroke-linejoin="round" stroke-miterlimit="10" d="M484.252,234.622l1.607-4.5
			l-3.215-3.215l6.91-3.374l3.857-5.143l4.66-5.303l1.928-8.195l-0.805-3.536l-3.053-4.821l-2.25-8.035l-8.676-2.57v-4.5
			l-6.75-3.214l-4.018-5.463l-2.732-2.571v-8.196l-5.143-6.588l-5.463-4.982l-4.5-0.643l-7.713-10.927l-0.16-7.714l-0.482-8.999
			l-1.928-3.374l0.803-2.732l-0.482-3.214l-4.66-2.893l-3.535-8.517l-3.215-2.089l0.482-5.143l-2.57-3.696l-4.982-1.768l-4.018-4.5
			l-3.535-2.571l-5.303-4.66l-3.857-2.089l-3.855,0.964l-1.607-2.41l-5.625,0.321l-2.893,0.964l-3.375-0.803l-6.105,4.821
			l-3.053,7.231l-3.215,4.018l-1.768,5.464l-3.053,1.285l-2.893-4.178l-2.893-0.322l-3.375-3.213l-4.338,1.928l-4.822,2.731
			l-5.303,2.089l-5.463-3.375h-9.32l-6.59-5.785l-1.123-2.089l-3.055-0.161l-2.41,1.768l-1.285,5.625l-3.375-0.482l-4.178-2.41
			l-0.482-4.5l-3.053,1.768l-1.287-1.606l-5.623,5.624l-1.445,3.696l-4.822,0.321l-1.607,1.768l-4.018,1.446l-5.141-0.321
			l-9.322-4.018l-3.053-2.893l-3.695-1.125l2.41-6.75l3.535,1.286l2.893-1.286l-2.25-6.107l1.768-4.017l-4.178-6.268l-2.572,2.892
			l-2.73-2.41l-3.857-5.303l3.215-1.125l2.893-1.286l0.643-6.91l1.125-1.928l-1.768-2.731l-2.572,0.803l-1.285-9.16l1.125-1.928
			l-1.447-3.213l-5.785,4.178l-3.373-2.089l-2.41,2.731l0.963,2.571l-1.285,3.857l-3.215,0.804l-1.123,4.338L251,48.695v5.303
			l1.205,3.696v1.929l-4.178,3.053l-8.678-1.125l-0.161-4.5l-4.5,1.928l0.643-3.375l-1.446-2.893l-3.214,0.161l-2.41-6.267
			l2.41-2.732l-2.893-2.571l-4.82-2.41l-8.196-3.054l-4.179,1.446l1.125-6.428l-3.856-1.607l-1.625-1.928l-3.517,0.804l-0.804,3.696
			l0.804,2.411l-6.75,0.643l-3.535-1.607l-5.946,1.929l-3.053,5.303l-3.215-0.482l-1.124,2.25l1.767,2.732l2.893,1.125v5.624
			l1.446,1.929l-2.25,0.803l-1.125,2.411l-2.411,1.286l-4.981,1.768l3.053,2.41v6.428l-3.053,4.179h-4.982L168,78.906l-2.893-1.125
			l-1.768,3.054l-5.625-2.571l-2.088,5.142l-1.769,4.179l-3.213,2.25h-4.5l-3.536-2.732l-4.017-3.053l-2.25,2.571l-1.929-0.482
			l-1.928,0.161l-1.607,2.571v2.25h3.214l-0.161,4.982l-1.607,1.446l-3.214-2.089l-1.446-2.089l-5.463-0.803l-6.106,2.25
			l-1.446-3.053l-0.964-4.018l-2.893-1.285l2.25-6.268l-2.25-3.535v-2.571l-4.018,3.535l-1.607,1.928l-2.089-2.089l2.893-2.732
			l0.322-4.5l-3.856-2.088l-2.893-3.214l4.66-2.571l0.16-6.588l-4.82-6.749l-3.053,1.285l-6.428-1.285l-7.231,0.803l-1.768,2.089
			l-2.731,1.607l1.125,1.928l-1.125,5.625l-0.804,3.535l1.446,2.089l3.053-0.161l-0.803,2.732l3.696,2.571l1.928,2.571l3.857,1.767
			l-6.75-0.16l-1.446-2.732l-3.053,0.643l-2.731-2.089h-1.928l-1.286,4.5l-1.607,1.446v4.018l-1.768,4.018v4.178l-1.286,2.731v2.732
			l-1.768,4.981l0.803,3.214H61.94v-2.089l-5.303,1.125l-2.25,6.268l-1.607,2.41v2.731l1.607,2.732h2.088l-2.892,3.054l-3.375-2.251
			v-2.892l-2.571,2.25l-1.768,6.106v4.017v3.857h4.339l0.803,2.089h5.625l0.482,4.017l4.821-0.964v-2.089l7.714-4.017l0.482,2.089
			l-1.928,3.375l-1.928,0.643l1.446,3.375l-4.661,1.928l1.607,4.982l2.41,1.286l1.768,3.374l2.571-0.964l0.161,4.017l3.053,5.303
			l2.731-1.125l5.625,11.409h2.893l3.696,0.964l4.018,0.803h2.571l-1.768,4.339l-7.713,1.446l7.392,4.982l-2.571,1.607l-1.607,4.339
			l-4.339,2.088l-3.053,2.411l0.643,4.82l2.089,2.089h-5.304h-2.893l-1.446-2.572l1.286-3.535l-3.053-0.643l4.821-5.625
			l-1.446-4.981l-1.768-1.446l-1.767,4.66l-2.25-0.643l2.25-5.786l-2.25-1.928l-2.41,3.696v4.66l-2.089,0.804l-0.321-3.856
			l-5.303-2.732l-2.732-4.017l-2.41-2.25l-0.161-6.268l2.732-2.41l1.446-6.749l0.321-7.874l-4.018,3.214l-2.731,0.322l0.804,2.892
			l-1.768,5.303l-5.625-0.804l0.964-2.892l-5.303-1.286l-2.893,2.41l-1.446-4.5l-3.696,0.161l-2.089,2.25l-1.285,3.536l-2.571,4.017
			l-0.964,2.732l4.339,2.41l0.161,3.856l-5.785-1.928l-1.125,1.767l-3.214-3.696l-4.017,1.125l-6.267-3.375l-2.893,1.607v1.929
			l-2.893-1.125L2,173.075v3.695l3.214,2.25L2,182.877l3.214,1.285l2.893,0.482l1.768,3.053l2.731-1.607l2.571,0.161l-1.607,2.732
			l1.607,2.25l1.286,3.374l2.25-0.161l-0.803-5.303l4.338-0.803l3.214,1.446l0.804,3.856l-2.571,2.089l1.607,4.5l-2.25,0.803
			l2.571,2.732h2.411l0.804-4.982l2.25,6.106l3.856-4.017l3.053-4.179l-3.696-2.893l-1.125-4.339l5.625-0.321l2.089-2.893
			l3.214,1.929v2.731L46.835,193l3.053-3.374l-0.804-2.25l-2.893-1.286l5.143-2.41l-1.125-3.375l0.643-3.856h4.178l2.571,4.821
			l1.768,2.892l-3.535,2.572l5.142,1.928l-0.482,2.732l2.25,4.339l4.5-3.375l4.018,0.16l1.768,4.822l-0.161,2.893l-14.945,9.963
			l6.107,2.089l-0.804,3.374h-2.25l-0.642,3.696h-3.536l-2.571,3.053l-2.41-4.5l-3.375-3.053l-1.928,3.214l-1.768,0.642
			l-0.482,3.696l3.053,3.858l1.606,2.571l3.536,1.446l-5.303,4.339l0.161,2.41h2.25l2.25-1.929l2.893,0.803v4.5l4.178,0.642h2.571
			l0.161-2.571l4.5,1.446l1.607-2.25l-1.125-3.375l2.089-3.535l-2.732-0.965l2.732-3.857l-1.768-2.25l-2.41-0.321l0.482-2.732
			l3.214-1.125l-2.25-3.535l1.928-4.821l2.571,2.893l0.322,6.75l3.856,2.411l-1.607,4.017v4.017l0.964,1.929l2.411,0.161
			l-3.053,3.374l0.964,2.893l3.696,2.25l-1.446,5.303l-2.41,1.608l-1.446,5.141h3.535l-1.125,3.375l0.482,2.41h2.411l0.482,5.625
			l2.089,1.768l-0.321,1.607h-3.696l-3.856,1.928l-7.714,11.409l-2.571,3.214l4.339,2.572l0.643,3.213h7.393l7.552-3.856
			l6.588-2.731l3.214,6.588l-4.5,1.607h-5.303l-4.66,1.606h-3.214l-4.82,2.411l0.803,4.338l-1.607,1.607l-2.411-0.643l-2.088,3.375
			l8.516,4.499l-0.482,3.856l-3.053,2.41l-1.768,4.661l-2.25,1.928l-2.732,0.804l-1.446-2.09l0.321-2.892l-4.018-4.659l-2.731-0.322
			l0.161-4.982l1.446-1.767l-2.571-1.607l-2.25-3.375l-1.767,2.09l-2.25-0.644l1.125-2.57l-4.178-3.856l-2.57,1.892l-4.339,12.41
			l2.25,2.25l-3.053,6.909l-2.732-2.57l-1.285,10.445l-0.482,5.784l3.856,7.393l0.322,3.535l3.535,2.41l2.732-2.089l1.767,2.089
			l-3.213,4.5l-0.161,4.339l-1.125,3.374l3.696,2.411l1.607-2.893l3.696,4.178l-1.285,4.018l2.732,2.893l4.982-0.643l7.07,0.643
			l3.214,3.374l5.143-1.446l1.446,2.41v4.822l-2.571,1.767l2.731,2.893l5.303-2.089l-0.161-3.053l2.732-0.644l2.571-2.893
			l3.536-0.16l1.286,2.571l-0.964,1.768l0.321,4.499l2.893-2.893l4.339,1.286l-1.607,2.893l-3.053,0.804v2.25h5.625l3.053,4.499
			l-1.768,1.768h-2.893l1.285,5.785l-1.928,2.41l2.25,4.019l2.25,3.856l-2.732,3.374l1.446,2.893l4.018,6.106l4.017-3.696
			l1.606,2.089l3.214-4.178l2.572,3.375l-1.769,3.053l1.929,3.214l-2.893,3.535l-5.142-0.964l-0.321,4.018l1.928,2.571l-1.606,1.768
			l-4.5,0.804l0.803,4.659l0.322,4.66v2.09l3.857-2.25h2.732l0.964-2.089l4.339,0.643l0.643,7.071l2.41,2.41l-4.178,6.428
			l1.607,2.893l-0.964,5.464l3.535,1.768l1.447-3.856h4.017l4.499-7.714l7.393,1.446l4.017,3.054l2.571-1.929l0.482-9.963
			l-0.642-2.41l5.303-3.536l-0.482-7.231l-3.053-0.482l-0.482-2.088l3.856-2.412v-4.499l4.018-2.41l3.214,0.804l1.446-4.178
			l10.125-2.572l4.981-4.339l5.464-1.928l1.928,0.964l8.035-12.052l-0.643-1.928l-2.893-2.25l4.179-2.732l4.017-2.732l-2.411-9.802
			l2.411-2.41l0.803-7.393l-0.964-4.339l0.964-19.444l4.179-3.054v9.481l-0.804,2.571l3.053,2.411v3.856l1.607,3.054l-1.607,6.105
			l0.321,4.66l-1.125,9.481l1.607,7.07l1.928,4.982l-4.017,1.446l0.481,3.535l3.536-0.482l2.411,0.321l-0.643,4.179l3.695,3.053
			l5.142-0.643l3.858-0.321l5.463,4.5l4.339,2.089l1.767,4.66l1.607-4.5l-1.125-4.178l-4.339-4.66l15.749,1.124l1.286,2.411h3.696
			v-1.929l2.088-1.768l0.804-1.929l-2.892-6.106l2.892-1.929l3.214,5.305l2.571,1.928v-5.143l3.696,1.446v-5.143l-3.856-3.696
			l0.643-4.178l2.089-0.643l4.018-15.428v-2.892h5.143v-3.535l-6.91-0.322l3.375-4.66l0.643-4.499l2.893-3.054l-3.375-4.017
			l-0.965-2.571l-7.392-0.804l3.536-1.768l11.568,0.964l8.518-3.696l7.553-10.284l8.678-2.731l4.34-3.375l1.445-5.464l3.375-3.856
			l5.143,4.66l7.23,0.482l5.625-1.286l5.303-8.999l2.09-3.375v-3.696l5.463-7.07l5.947-1.321l1.285,4.054v3.054l2.891,4.017
			l3.055-4.339l6.105,3.857l2.412-4.499l3.213-3.055l5.143-0.16l1.607,13.659v4.66l-4.018,7.714l-0.322,6.428l-12.053-2.089
			l0.482-4.339l1.447-4.982l-1.285-8.195l-5.947,1.606l-5.143,4.822l-1.928,3.695l1.285,2.731l-3.213,1.286l-1.93,9.802
			l-8.676,2.412l-7.393,7.552l-0.805,7.553l0.645,4.34l-2.09,1.767l-4.178-1.125l-0.805-2.571l-2.73,4.66l-4.18,4.982l-4.178,5.463
			l-0.643,4.66l3.375,1.769l-0.32,4.178l8.355,4.018l5.785-1.446l3.857-2.571h4.658l4.02,3.375l3.695-4.019l3.535,2.893
			l-0.643,2.572l4.178,0.964l1.125-2.893l3.053,1.286l1.607,2.57l4.338,3.856l2.09,2.571l-4.34,4.018l6.59,3.535l6.428,6.106
			l-2.572,1.929l5.947,4.018l4.498-1.286v-3.856l-5.623-4.499l6.75-5.304l3.213,0.482l0.803-3.695l3.375,1.124l1.768,3.375
			l3.697-1.606v-5.305l-1.77-2.57l4.822-1.124l3.213,1.284l1.125-3.053v-2.731l4.178,2.089l2.412,0.803l-1.285-7.873l4.338-5.143
			l-4.5-3.214l-8.678-1.768l2.57-3.535l-3.373-4.5l2.09-2.41l3.855-0.321l0.965,3.695l2.41,0.161l1.445-3.054l3.215,2.571
			l2.09,1.768l2.73-2.731v-3.054l3.053,3.856l2.572,2.893l5.143-2.41l4.66-5.303l-1.285-6.428l-1.93-6.589l-7.23-2.731l-4.34-3.696
			l1.607-1.606l3.857,2.731l1.285-1.445l4.34,1.606l-1.287-3.856l-3.855-1.286l-7.232-3.214l-4.98-4.018l-4.34-5.303l-9.963-7.714
			l-0.322-2.731l-3.213-3.536l-1.93-4.98l2.412-3.696l2.73-0.322l3.375-2.41l0.965-4.339l-4.018-2.41v-4.5l5.463-5.303l4.5-3.374
			l-7.713-1.929l-2.09,1.286l-2.732-4.661l-10.766-5.142l12.053,1.124l4.018,4.179l7.068-2.089l4.502-6.106l2.25,4.98l8.195-4.177
			l5.463,2.41l1.607-3.536l-0.965-10.123l8.035,0.321v3.215l1.605,2.891v4.019l2.252,2.571l3.855-0.965l-0.965,4.339l-4.98,4.821
			l-0.322,3.856l5.465,1.606l3.213-2.088l3.055,2.088v3.857l3.213,4.82l1.285,4.5l-0.963,3.178l2.41,0.679l1.768-2.893l2.57,6.749
			l-5.143,4.982l-6.748,5.785l-0.965,2.57l2.09,1.607l5.945,2.249l1.285,3.215l-4.82-2.251l-4.018,1.769l-0.803,4.178l3.535,2.089
			l-3.375,3.857l0.16,3.535l4.178,1.446l2.25,4.821l2.25-3.857l5.303,0.482l6.91,3.696l1.445,3.374l4.662,1.607v-5.785l-4.34-4.981
			l2.09-3.856l-2.572-6.429l0.643-5.624l-2.57-3.053l1.768-3.856l5.945,3.374l-0.803-5.624l6.75-12.695l12.051,13.017l9.482-3.375
			v-2.893l4.98,0.804l1.93-1.446l-1.607-3.375l1.607-4.66l-3.215-5.946l3.215-3.534l0.963-4.339l3.053-0.322v-10.767l2.41-3.053
			v-8.838l-3.855-1.125l-5.143,1.125l-2.73-0.322l1.605,4.66l-5.625-4.178l-4.016,0.643l-6.268-1.285l-3.857,7.07l-3.695,2.893
			l-1.93-3.215l-7.713,6.269l-3.857-3.536l4.34-3.053l-4.82-6.106l-4.18,3.536l-5.623-9.161l7.553-6.106l-6.107-8.356l-5.625-1.606
			l6.75-2.893l0.16-4.339l2.572-0.481l0.965,5.784l8.678,14.945l17.836-12.695l0.805-5.784l4.5-1.447l0.963,2.088l-2.732,2.572
			l-0.643,5.303l9.643,1.607l7.23-0.321l0.482,6.427l4.338,2.732l3.055-0.321v-11.088l-5.465-6.106L484.252,234.622z
			 M266.346,147.042l-2.73,1.447l-1.607,7.07l1.607,6.75l-4.5,4.017l-3.053,2.411v5.463l-4.018,0.964l-3.857,2.572l-0.964,2.731
			l-4.66,1.286l-4.018-1.125l-4.338-5.785l-2.411,0.964l-1.285,3.053l-3.215,1.606l-2.731-1.446l-5.303,2.732l-3.696-1.928
			l-2.732,4.5l-6.606,1.767l-2.393,3.856h-5.143v-2.089l-1.928-1.446l-4.178,3.535h-3.214l-0.161-2.732h-4.339l-1.125-2.892
			l6.267-1.125l-1.928-3.053l-0.964-4.339l-2.732-0.804l-4.82-5.946l-8.678-2.089l-4.982,1.606l-3.053-2.088l-0.481,3.053
			l-3.696,0.804l-0.804-2.572l-2.411-1.607l-2.41-1.125l0.803-8.838l-2.893-1.767l2.089-0.804l1.607-5.946h2.25l2.25-2.893
			l-4.5-7.553l6.749,1.125v-4.5l3.215-5.786l3.856,4.018l2.41-2.732h3.214l-0.804-4.339l3.053-4.5l2.732-5.624l2.732,0.803
			l5.303-3.214l-0.804,4.981l-2.411,0.965l-0.161,3.213l5.946,1.286l2.893,2.731l7.231,2.41l5.303-1.928l1.107-3.213l3.393,0.964
			l12.534-8.999l3.215,2.571l4.981-4.981h3.214l1.285,2.089l3.696,1.446v2.893l3.215,1.607l3.374,4.5l-2.25,1.286l3.536,4.66
			l3.536,2.732l-3.215,3.536l4.259,5.946l0.883-2.732l2.732-1.446l1.768,0.803l3.375-1.607l6.588,6.589V147.042z"/>
	</g>
</g>
</svg>

</template>